TABLE 6 Bulge-to-Disk Fits

Galaxy I_e R_e I(0) ff B/D Comments

142-31 22.38 0.2 22.5 0.61 0.20 flat between r=0.4 and 0.6 284-2 22.77 0.9 22.6 1.89 0.75 best Ø^2 of all 7 732-13 22.55 0.4 22.3 0.71 0.90 noisy outer ”disk” 733-14 22.58 0.2 22.7 1.31 0.10 poor fit but still likely small B/D 734-13 21.75 0.2 21.1 0.36 0.60 difficult fit; r = flat 0.35-0.55 M3-9 20.80 0.3 20.3 0.42 1.20 HSB Object! M4-4 21.73 0.2 21.8 0.38 1.00 reasonable fit