Table 2: Derived information on all galaxies with central surface brightness

˘22.0 Bμ(0) except for the fields taken 10/26/95-10/30/95. See section 5.

Galaxy Other Name Ident RA Dec m(5”) mT m(α) μ(0) μc(0) i α(”) α(kpc) r_{27}(”) r_{25}(”)

P1-1 UGC12535 23:18:30 07:54:18 17.83 15.65 - 23.100 24.412 72.6 - - 48.82 34.00 P1-2 23:18:44 07:48:27 19.51 18.27 17.44 22.957 23.740 60.9 5.072 0.984 15.73 8.894 P1-3 KUG 2318+079B 23:18:46 07:58:01 18.28 17.15 16.86 21.981 22.197 44.9 4.221 0.819 15.89 11.07 P1-4 23:19:04 07:59:01 18.20 16.56 16.68 22.207 22.307 24.2 5.085 0.987 26.78 12.93 P1-5 23:17:17 07:59:54 18.93 17.50 17.39 22.845 23.125 26.4 4.916 0.954 15.89 10.98 P1-6 23:17:23 07:39:25 18.99 17.92 17.60 22.489 22.771 39.6 3.785 0.734 15.89* 8.564 P1-7 UGC12522 23:17:44 07:43:53 18.45 15.14 15.04 23.082 23.168 22.5 16.20 3.142 52.39 27.02 P2-3 23:14:27 07:35:55 18.47 17.42 17.71 24.007 24.558 53.0 7.256 1.408 22.69 8.99 P2-1 23:13:44 07:36:41 19.44 18.34 17.97 23.145 23.278 27.7 4.3179 0.838 12.23 7.86 P2-2 23:14:13 07:38:56 19.81 18.58 18.08 23.525 24.212 57.9 4.892 0.949 15.89 6.79 P2-4 23:14:29 08:14:57 22.27 17.37 16.71 25.137 25.474 42.9 19.30 3.745 25.64 1.28 P3-1 KUG 2322+077 23:22:27 07:43:22 18.56 16.85 - 22.950 23.182 36.1 - - 21.04 13.21 P3-2 23:20:31 08:01:21 18.78 17.37 17.27 22.591 22.851 38.1 4.634 0.899 16.69 10.41 P3-3 23:20:34 08:05:07 19.79 17.29 17.05 23.222 23.713 50.5 6.843 1.327 22.32 10.86 P3-4 23:20:57 08:09:54 19.05 17.43 - 23.000 23.955 65.5 - - 19.42 13.43 P4-1 KUG 2313+083 23:13:28 08:19:42 18.40 16.29 15.91 22.364 22.864 50.9 7.793 1.512 26.55 19.11 P4-2 KUG 2314+083 23:14:48 08:23:49 18.43 17.34 16.76 22.097 22.807 58.7 4.652 0.902 18.99 12.82 P4-3 23:13:36 08:35:44 18.57 17.29 16.83 22.265 23.103 62.5 4.884 0.948 24.32 14.10 P4-4 23:13:52 08:43:50 18.34 17.17 - 23.010 23.065 18.0 - - 14.49 11.30 P5-1 23:17:36 08:20:41 18.94 17.46 17.04 22.856 23.579 59.1 5.823 1.130 21.54 13.39 P5-2 23:17:11 08:24:45 19.06 17.78 17.14 22.996 23.404 46.6 5.927 1.150 15.80 9.891 P5-3 23:18:58 08:27:05 19.12 18.05 17.58 22.813 23.284 49.6 4.447 0.863 14.34 8.923 P5-4 23:18:09 08:28:38 19.50 18.11 16.18 23.276 24.294 67.1 7.037 2.030 20.00 10.65 P5-5 23:17:03 08:29:12 20.96 18.58 - 24.350 24.594 37.0 - - 14.18 7.388 P5-6 23:19:15 08:45:59 19.54 16.97 15.07 23.437 24.726 72.2 18.80 3.648 35.69 26.56 P5-7 23:16:38 08:55:20 18.49 16.52 - 22.800 22.911 25.4 - - 20.58 13.91 P6-1 23:21:01 08:20:56 19.55 17.23 15.95 23.198 24.185 66.2 11.24 2.181 30.75 20.73 P6-2 23:21:06 08:35:04 18.93 17.58 - 23.201 23.402 33.8 - - 15.00 9.396 P6-3 23:22:19 08:36:46 19.65 18.39 - 24.356 24.548 33.1 - - 12.90 7.609 P6-4 UGC 12561 23:20:26 08:43:01 18.57 15.60 14.56 22.879 23.770 63.9 18.44 3.577 55.34 41.13

* Galaxy’s surface brightness did not reach 27.0 before disappearing amoung the noise. Coordinates are good to within 10” (Bμ(0) ˇ24.5 mag/arsec^2 ) or 20” (Bμ(0) ˘24.5 mag/arsec^2 ).

Table 2: Derived information on all galaxies with central surface brightness

˘22.0 Bμ(0) except for the fields taken 10/26/95-10/30/95. See section 5.

Galaxy Other Name Ident RA Dec m(5”) mT m(α) μ(0) μc(0) i α(”) α(kpc) r_{27}(”) r_{25}(”)

P6-5 23:21:07 08:52:22 19.70 17.40 17.19 24.168 24.990 62.0 9.921 1.925 25.31 8.230 P6-6 23:21:35 08:57:01 19.64 18.43 17.67 23.785 23.974 32.9 6.669 1.294 12.82 7.515 P7-1 FGC 284A 23:20:27 07:23:57 19.34 17.07 15.60 23.342 24.752 74.2 14.12 2.739 35.71 24.45 P9-1 23:16:17 06:49:27 20.78 17.14 17.62 23.433 23.679 37.2 5.804 1.126 17.14 9.846 P9-3 23:15:46 06:59:29 20.40 18.75 17.45 24.808 25.029 35.3 11.83 2.296 14.75 3.955 P9-4 23:16:08 07:14:19 20.84 18.86 17.96 24.016 25.041 67.1 6.491 1.259 17.97 6.778 P10-1 23:12:54 06:48:42 20.67 19.16 18.52 24.032 24.452 47.2 5.057 0.981 12.15 4.400 C1-1 08:17:14 20:53:51 18.33 16.75 17.52 22.176 23.003 62.2 5.317 1.161 17.52* 13.28 C1-2 08:17:00 21:01:12 18.99 18.10 18.04 22.471 22.543 20.6 3.066 0.669 13.39 7.384 C1-4 08:16:29 21:09:39 18.09 16.55 15.92 22.289 23.151 63.1 7.485 1.634 28.33 18.18 C1-5 08:19:01 21:10:58 18.77 16.08 16.067 22.206 22.646 48.2 6.740 1.471 26.48 16.82 C1-6 08:16:44 21:13:21 18.18 16.77 - 22.330 22.781 48.7 - - 24.84 12.72 C2-1 08:14:38 21:01:54 18.80 17.65 17.17 22.609 22.490 26.9 4.817 0.940 13.73 9.600 C3-1 08:19:59 20:56:42 18.42 17.22 17.08 22.531 22.592 19.1 4.921 1.074 18.47 10.99 C3-2 Cf19 08:19:41 21:09:25 18.17 16.34 - 22.350 22.756 46.5 - - 28.94 15.62 C3-3 08:22:17 21:11:44 19.79 18.29 17.50 23.341 23.827 50.3 5.864 1.280 16.80 8.960 C3-4 08:22:06 21:36:34 18.55 17.03 - 22.700 22.097 46.1 - - 15.14 11.26 C3-5 08:21:38 21:36:50 19.34 17.69 - 23.500 23.631 27.6 - - 13.39 9.408 C3-6 Cf22 08:20:57 21:34:50 18.70 16.41 15.47 22.177 23.140 65.7 8.761 1.912 30.41 22.15 C4-1 08:21:38 21:36:50 18.97 17.83 - 23.350 23.628 39.3 - - 14.04 8.169 C4-2 08:20:34 21:46:30 20.59 17.69 - 24.000 24.169 31.1 - - 17.52* 11.05 C4-3 08:22:30 21:50:03 19.06 17.48 16.72 23.122 23.622 50.9 7.622 1.664 18.73 14.31 C4-5 08:22:52 22:02:35 18.96 18.23 17.77 22.369 23.038 57.3 3.312 0.723 11.86 7.796 C4-6 FGC 0749 08:21:40 22:11:00 - - - - - - - - - - C4-7 08:22:42 21:55:33 20.20 19.09 17.70 23.820 24.837 66.9 6.681 1.458 12.40 7.486 C4-8 08:20:05 22:07:49 19.59 18.49 17.85 23.084 23.503 47.2 4.451 0.971 14.28 9.143 C5-1 08:24:54 22:22:35 18.48 17.71 - 22.400 22.636 36.4 - - 10.76* 9.331 C5-2 08:24:07 22:38:37 19.84 18.24 17.31 23.175 23.983 61.6 5.931 1.294 18.11 10.27

* Galaxy’s surface brightness did not reach 27.0 before disappearing amoung the noise. Coordinates are good to within 10” (Bμ(0) ˇ24.5 mag/arsec^2 ) or 20” (Bμ(0) ˘24.5 mag/arsec^2 ).

Table 2: Derived information on all galaxies with central surface brightness

˘22.0 Bμ(0) except for the fields taken 10/26/95-10/30/95. See section 5.

Galaxy Other Name Ident RA Dec m(5”) mT m(α) μ(0) μc(0) i α(”) α(kpc) r_{27}(”) r_{25}(”)

C5-3 08:24:48 22:38:49 20.12 18.88 18.34 23.891 23.958 19.9 5.139 1.122 12.12 3.842 C5-4 08:22:43 22:56:39 18.60 17.23 17.07 22.216 22.533 41.7 4.276 0.933 19.50 11.39 C5-5 08:24:15 23:03:34 19.87 18.08 16.24 23.922 24.297 44.9 13.72 2.994 17.18 12.71 C6-1 08:24:36 21:39:59 18.57 17.53 17.16 22.105 22.466 44.2 3.889 0.849 15.14 9.619 C6-2 08:22:31 21:50:05 19.14 17.55 16.94 23.218 23.720 50.9 7.200 1.571 22.36 13.08 C6-3 08:23:25 21:55:16 20.30 18.10 17.68 23.951 24.258 41.1 7.158 1.562 17.97 6.215 C6-4 08:22:53 22:02:36 19.33 18.21 17.71 22.956 23.809 62.9 4.478 0.977 18.45 8.430 C6-5 08:24:19 22:04:12 19.64 18.06 - 23.604 24.164 53.3 - - 11.86* 10.69 C6-6 08:24:18 22:03:57 19.13 17.80 18.03 22.836 23.402 53.6 3.657 0.798 14.25 6.852 C8-1 08:16:09 21:44:47 19.39 18.02 17.48 22.972 23.489 51.6 5.007 1.093 16.32 10.88 C8-2 08:13:07 21:46:27 18.43 17.57 17.21 22.081 22.201 26.5 3.755 0.820 10.76* 10.76 C8-3 08:14:21 21:48:32 19.22 17.95 18.70 22.991 24.266 72.0 2.876 0.628 17.52* 11.64 C8-4 08:13:21 21:50:57 19.67 18.50 18.04 23.595 23.783 32.8 5.161 1.126 11.30 6.638 C8-5 08:15:18 21:58:23 18.75 17.64 16.38 22.532 23.617 68.4 6.786 1.481 19.82 12.15 C8-6 08:15:34 22:12:39 18.28 17.62 17.41 22.382 22.977 54.7 3.935 0.859 14.83 10.11 C8-8 08:14:31 22:01:40 18.59 17.60 16.60 21.988 22.629 56.4 4.764 1.040 14.42* 11.86 C9-1 08:15:16 20:21:09 19.70 18.15 17.69 23.787 23.912 27.0 6.608 1.442 16.06 8.535 C10-1 08:16:26 20:25:33 20.93 18.88 18.30 24.489 24.783 40.3 6.909 1.508 14.33 3.068 C11-1 08:20:09 20:21:08 18.46 17.75 17.22 22.781 23.746 65.7 5.172 1.129 18.40 11.10 C11-2 08:22:57 20:22:43 - - - 22.400 22.698 40.5 - - - - C11-3 08:21:13 20:32:17 21.76 20.02 18.18 25.582 25.860 39.3 12.05 2.629 10.86 1.292 C11-4 08:22:26 20:33:43 18.61 17.20 16.36 22.278 23.039 60.3 6.095 1.330 20.35 14.71 C11-5 08:19:59 20:56:41 18.51 17.24 17.20 22.372 22.466 23.5 4.309 0.941 18.00 10.30 N1-1 06:09:47 78:02:53 19.13 17.62 17.45 22.847 23.234 45.6 4.801 0.208 19.61 8.208 N1-2 06:11:05 78:28:42 20.50 18.65 18.10 24.227 24.677 48.6 6.707 0.290 14.96 5.623 N1-3 06:15:55 78:46:44 20.19 18.73 17.34 24.597 24.899 40.8 11.27 0.488 12.81 3.800 N2-1 10:40:42 24:55:13 19.19 18.32 17.93 22.654 22.773 26.8 3.512 0.998 11.30* 8.535 N2-2 10:39:49 24:57:19 18.82 16.99 16.04 22.385 23.485 68.7 7.405 0.210 28.54* 17.98 N2-3 10:41:23 24:58:18 18.73 18.20 17.33 22.158 22.329 26.9 3.680 0.105 11.86 7.317 N2-4 10:40:18 25:26:23 20.04 18.28 16.45 23.423 24.890 75.0 9.889 0.281 25.89* 14.73

* Galaxy’s surface brightness did not reach 27.0 before disappearing amoung the noise. Coordinates are good to within 10” (Bμ(0) ˇ24.5 mag/arsec^2 ) or 20” (Bμ(0) ˘24.5 mag/arsec^2 ).

Table 2: Derived information on all galaxies with central surface brightness

˘22.0 Bμ(0) except for the fields taken 10/26/95-10/30/95. See section 5.

Galaxy Other Name Ident RA Dec m(5”) mT m(α) μ(0) μc(0) i α(”) α(kpc) r_{27}(”) r_{25}(”)

N3-1 12:30:26 07:45:59 19.05 18.02 17.04 22.570 23.469 64.1 5.103 0.111 16.37 11.59 N3-2 12:31:10 08:03:32 21.59 18.63 17.72 24.598 25.239 56.4 9.456 0.205 18.77 2.418 N3-3 12:30:15 08:04:18 19.56 17.84 17.00 23.404 23.951 52.8 7.621 0.166 21.44 12.39 N3-4 12:31:04 08:08:59 19.27 16.49 15.25 22.985 23.654 57.3 14.04 0.305 47.43 25.24 N7-1 14:36:31 20:23:35 19.90 18.40 - 23.350 24.323 65.9 - - 17.29 10.34 N8-1 12:35:36 29:15:42 19.55 18.14 17.37 23.488 24.930 74.6 6.681 2.363 23.48* 8.472 N8-2 12:34:34 29:29:34 19.50 18.09 - - - 85.1 - - 2.740* 2.740 N9-1 10:17:29 28:00:16 18.41 17.29 16.71 21.987 22.285 40.5 4.534 1.092 16.90 12.07 N9-2 10:17:33 28:23:02 19.80 18.89 18.65 23.543 23.967 47.4 3.797 0.915 12.45* 4.279 N10-2 11:56:08 20:51:25 18.03 16.57 16.25 22.281 22.809 52.0 6.407 1.926 26.91 15.85 N10-3 11:54:25 21:01:52 19.91 18.99 18.57 23.871 24.356 50.2 4.585 1.378 12.97 4.313 N10-4 11:56:18 21:15:10 19.94 18.90 18.27 24.051 24.214 30.6 5.724 1.720 10.76* 4.092 N10-5 11:56:17 21:27:12 21.78 20.54 18.64 25.378 27.099 78.2 8.889 2.672 10.76* 1.297 N11-1 10:59:13 27:54:07 19.16 17.97 17.57 22.499 22.972 49.7 3.862 1.679 14.27 10.01 N11-2 10:59:32 28:08:49 18.83 17.70 16.90 22.256 22.800 52.7 4.704 2.045 14.97 11.28 U1-1 11:37:34 17:03:57 18.61 17.25 - 22.950 23.217 38.6 - - 17.52* 11.75 U1-2 11:36:56 17:08:42 19.64 18.66 18.01 23.287 24.121 62.4 4.538 1.398 15.41 6.633 U1-3 11:36:44 17:08:52 18.33 17.66 - 22.390 22.825 47.9 - - 11.30* 17.90 U1-4 11:35:49 17:21:51 19.00 13.08 14.27 22.696 23.289 54.6 19.32 5.952 40.93 28.79 U1-6 11:37:41 17:42:17 19.84 18.43 18.00 23.410 23.599 32.9 4.820 1.485 13.07 7.130 U1-7 11:37:47 17:46:02 19.30 17.69 16.87 23.348 23.879 52.2 7.893 2.432 22.36 11.62 U1-8 11:36:47 17:07:09 19.30 18.15 16.98 22.914 24.092 70.2 6.144 1.892 20.68 11.04 A1-1 14:24:53 26:00:30 19.23 17.91 17.47 23.055 23.467 46.8 5.212 1.100 19.01 9.143 A1-2 14:24:06 26:00:00 19.88 17.93 17.35 23.886 24.269 45.3 8.090 1.707 23.41 7.035 A1-3 14:23:27 26:19:44 19.71 18.43 17.69 23.530 23.678 29.2 5.867 1.238 14.44 6.930 A1-4 14:24:25 26:35:30 18.76 16.82 17.16 22.454 23.370 64.5 4.572 0.965 9.760 8.997 A1-5 14:22:31 26:16:28 18.92 17.77 17.21 22.091 22.452 44.2 3.780 0.798 18.55 9.636 I1-1 15:38:32 28:31:50 20.04 14.82 15.53 23.200 23.480 77.1 13.66 6.484 44.09 16.85 I1-2 15:38:02 28:26:08 18.52 16.42 16.00 22.731 23.095 44.4 8.868 4.208 27.18* 17.94

* Galaxy’s surface brightness did not reach 27.0 before disappearing amoung the noise. Coordinates are good to within 10” (Bμ(0) ˇ24.5 mag/arsec^2 ) or 20” (Bμ(0) ˘24.5 mag/arsec^2 ).