Table 2: Derived information on all galaxies with central surface brightness

˘21.0 Vμ(0) for the fields taken 10/26/95-10/30/95. See section 5.

Galaxy Name RA Dec m(5”) m_T m(α) μ(0) μ_c(0) i α(”) r_{25.5}(”) r_{24.0}(”)

N4-1 (UGC 394) 00:35:36 41:30:45 19.58 17.10 16.59 22.828 23.245 47.1 7.062 14.80 7.573 N4-2 00:36:00 41:43:25 17.52 14.72 14.09 21.741 22.831 68.5 13.49 53.11 27.45 N5-1 20:34:07 60:10:47 17.20 15.58 16.54 21.885 22.307 47.3 4.680 14.92 9.000 N5-2 20:35:29 59:39:26 16.46 14.13 16.05 21.800 22.211 46.8 5.640 22.36 16.38 N5-3 20:33:53 59:36:18 17.53 13.79 16.94 21.853 22.918 68.0 3.841 11.30* 8.230 N5-4 20:30:45 59:30:30 16.96 14.98 14.53 21.758 22.832 68.2 11.11 24.66 19.24 N6-1 02:26:26 33:01:57 18.67 17.70 17.63 22.887 23.199 41.4 4.481 9.760 5.349 N6-2 02:23:13 33:26:13 19.06 14.50 - 21.900 23.158 71.7 - 21.30 17.05 N6-3 02:21:33 33:28:42 17.29 15.47 - 22.150 21.539 40.0 - 22.52 15.85 N6-4 02:23:26 33:50:31 18.61 15.97 15.14 21.957 23.591 77.2 9.205 29.97* 24.95 * Galaxy’s surface brightness did not reach 25.5 before disappearing amoung the noise. * Coordinates are good to within 10”.