TABLE 2

Galaxy Morph. v B M_B �v_{20} �v_{50} Flux M_{HI} M_{HI} /L_B M_{HI} /L_{B(α)} B�V i Name Type km/s km/s km/s Jy km/s 10^8 Mfi Mfi /Lfi Mfi /Lfi

P1-2 Sc 3828 18.27 -15.26 268 192(35) 0.462 2.824 2.870 1.338 0.72 62ffi P1-3 Sc 3746 17.15 -16.35 391 375 1.208 7.107 2.647 2.021 0.64 39ffi P1-4 Sm 3890 16.56 -17.02 104 88 0.234 1.483 0.298 0.333 0.86 34ffi(10ffi) P1-7 Sc 2808 15.14 -17.73 135 111 4.898 16.15 1.687 1.538 0.90 30ffi(10ffi) P2-3 Sbc 3178 17.42 -15.73 112 95 1.817 7.697 5.074 6.638 0.44 36ffi P3-1 Sm 11280 16.85 -19.07 199 172 0.409 21.78 0.662 - - 35ffi P3-3 Im 3469 17.29 -16.05 108 75(35) 0.224 1.131 0.555 0.444 - 44ffi P4-1 Sc 7992 16.29 -18.87 251 228 1.310 35.94 1.314 0.904 - 48ffi P4-4 S: 7921 17.17 -17.97 114 99 0.474 12.45 1.043 - - 40ffi(10ffi) P5-1 Sm 2953 17.46 -15.52 170 149 0.626 2.289 1.831 1.244 0.48 60ffi P5-2 Sm 8666 17.78 -17.55 137 113 0.593 18.63 2.297 1.274 0.68 42ffi P5-4 Sc 3029 18.11 -14.93 168 129(30) 0.671 2.580 3.554 0.600 0.70 63ffi P5-5 Im 3117 18.58 -14.52 71 57 0.16(0.02) 0.626 1.257 - 1.21 49ffi(10ffi) P5-6 Sbc 3667 16.97 -16.49 367 255 3.053 17.21 5.632 0.979 0.72 72ffi P5-7 Sc 12277 16.52 -19.59 148 143 0.333 24.74 0.466 - 0.73 28ffi P6-1 Sd 10882 17.23 -18.61 430(35) 366 1.500 74.10 3.443 1.059 0.94 70ffi P6-4 Sbc 3743 15.60 -17.90 215 201 4.433 26.02 2.325 0.892 0.67 69ffi P7-1 Sc 3471 17.07 -16.27 185 164 1.429 7.218 2.894 0.747 - 75ffi(10ffi) P9-1 Sc 3252 17.14 -16.06 84 69 0.364 1.614 0.785 1.122 - 37ffi P9-3 Sm 7949 18.75 -16.37 187 177 0.439 11.60 4.242 1.281 - 55ffi(10ffi) P9-4 Sc 4205 18.86 -14.90 91 78 0.199 1.475 2.089 3.249 - 60ffi(10ffi)

TABLE 2

Galaxy Morph. v B M_B �v_{20} �v_{50} Flux M_{HI} M_{HI} /L_B M_{HI} /L_{B(α)} B�V i Name Type km/s km/s km/s Jy km/s 10^8 Mfi Mfi /Lfi Mfi /Lfi

C1-2 Sc 8531 18.10 -17.21 268 201(50) 5.846 178.0 30.03 28.41 1.12 28ffi C1-5 Sc 7717 16.08 -19.01 240 229 0.436 10.87 0.321 0.346 0.73 67ffi C1-6 Sc 4240 16.77 -17.01 173 145 0.336 2.524 0.512 - 0.88 50ffi C3-6 Sbc 4010 16.41 -17.24 218 189 0.344 2.321 0.381 0.160 0.52 68ffi C4-1 Im 7905 17.83 -17.31 419 410 2.118 55.43 8.527 - 0.57 32 C4-2 Im 5168 17.69 -16.52 103 85 0.374 4.184 1.329 - 1.28 67ffi(10ffi) C4-3 Sm 4390 17.48 -16.37 170 151 0.711 5.738 2.100 1.042 0.49 55ffi C4-6 Sc 4703 - - 263 241 0.714 6.610 - - - - C5-3 Im 12942 18.88 -17.30 130 123 0.370 25.94 4.027 2.449 1.18 51ffi(10ffi) C5-5 S: 5524 18.08 -16.27 402 392 6.286 80.44 32.25 5.922 0.97 70ffi(10ffi) C6-1 Sc 4322 17.53 -16.29 385 333 1.755 13.72 5.399 3.841 - 47ffi C6-5y Sc 7579 17.80 -17.25 170 143 0.830 19.99 3.248 - - 62ffi C6-6y Sc 7579 18.06 -16.99 170 143 0.830 19.99 4.128 5.102 - 54ffi C8-1 Sc 4865 18.02 -16.06 144 127 0.585 5.803 2.822 1.717 0.58 59ffi(10ffi) C8-3 Sm 3570 17.69 -15.72 263 256 2.262 12.07 8.057 16.01 0.55 61ffi(10ffi) C9-1 Sm 6884 18.15 -16.69 64 54 0.359 7.123 1.940 1.270 0.90 52ffi(10ffi) N9-2 Im 7746 18.89 -16.21 118 89 4.282 107.6 45.63 36.59 0.82 47ffi N10-3 Im 7626 18.99 -16.07 155 137 0.232 5.652 2.724 1.851 0.88 48ffi N10-4 Sc 7478 18.90 -16.12 80 73 0.418 9.778 4.502 2.520 0.37 35ffi U1-4 Sc 3450 13.08 -20.05 191 181 1.932 9.632 0.0988 0.296 - 55ffi I1-1 Sc 9237 14.82 -20.16 298 262 0.723 25.83 0.288 0.196 0.78 77ffi I1-2 Sc 9469 16.42 -19.12 175 162 1.048 39.39 1.144 0.771 0.71 44ffi