TABLE 3

Name 1œ Detection (mJy) L-Narrow L-Wide

P1-5 1.0 0.5 P1-6 1.4 1.7 P2-1 1.4 - P2-2 1.4 1.3 P2-4 0.7 1.0 P3-2 1.4 - P3-5 0.9 1.2 P4-2 1.4 - P4-3 1.5 1.5 P5-3 1.4 - P6-2 1.3 - P6-3 1.2 - P6-5 - 1.3 P6-6 1.6 1.4 P10-1 0.8 0.9 C1-1 1.5 1.4 C1-4 0.8 1.0 C2-1 1.0 1.4 C3-1 1.2 1.1 C3-2 1.4 1.2 C3-3 - 1.1 C3-4 - 2.4 C4-5 1.3 1.4 C4-7 - 1.4 C4-8 0.8 2.1 C5-1 1.5 4.6 C5-2 1.0 1.2 C5-4 - 2.6 C6-2 - 2.6 C6-3 - 1.6 C6-4 - 1.3 C8-2 0.9 1.4 C8-4 - 1.4 C8-5 1.4 1.4 C8-6 - 1.5 C8-8 1.4 2.0 C10-1 - 1.4 C11-1 0.9 1.3 C11-2 - 1.5 C11-3 0.9 1.7 C11-4 - 1.5 C11-5 1.4 3.8 N2-1 0.7 - N2-2 1.5 - N2-3 1.4 - N2-4 2.7 - N3-1 1.9 - N3-2 1.9 -

TABLE 3—Continued

Name 1œ Detection (mJy) L-Narrow L-Wide

N3-3 1.9 - N3-4 1.0 - N8-1 1.3 - N8-2 1.4 - N10-2 0.5 1.0 N10-5 0.8 1.0 N11-2 2.4 - U1-1 2.4 - U1-2 2.4 - U1-3 2.5 - U1-6 1.5 - U1-7 1.4 - U1-8 2.5 - A1-1 2.0 - A1-2 0.4 - A1-3 0.5 - A1-4 0.9 - A1-5 1.0 -