TABLE 4

OFF State ON State

Model 1:

LB 1.0 x 10^9 3.2 x 10^9

B � V 0.88 0.38

M/LB 30. 9.4 Giant Br. Contr. 9.0% 3.0% AFO Star. Contr. 0.0% 68%

Model 2:

LB 1.0 x 10^9 3.6 x 10^9

B � V 1.02 0.42

M/LB 34. 9.5 Giant Br. Contr. 4.0% 1.0% AFO Star. Contr. 0.0% 72%

Model 3:

LB 1.0 x 10^9 4.4 x 10^9

B � V 1.02 0.33

M/LB 34. 7.9 Giant Br. Contr. 4.0% 1.0% AFO Star. Contr. 0.0% 77%

Giant Branch and AF0 star contributions are calculated in the B band. Models 1 and 2 use MS: A0,F0,G2,G5,K0,M0,M5; Giant: K3 type stars. No stars more massive than 2.0Mfi ever form in models 1 and 2. Model 3 includes Stars of type O6