– 1 –

Table 3.

Stellar Type MV B�V V�I Ref.

A0, V +0.7 0.00 0.00^a F0, V +2.6 +0.27 0.47^a K0, III +0.7 +1.00 1.00^b;^c K2, III +0.5 +1.10 1.11^b;^c K3, III +0.3 +1.18 1.28^b;^c K5, III -0.1 +1.45 1.53^b;^c M2, III -0.4 +1.55 1.97^b;^c

aAllen 1973 bSilva, 1992 cBessel, 1979